
                      GO (EXECUTE) function

	The GO function is used to initiate instruction execution by
the M68332. The GO function is invoked by pressing the <F9> key.

	Upon invocation, the GO function requests an execution
address. You may supply a valid hex-decimal number or default the
entry by pressing the <Enter> key only. If you supply a valid hex-
decimal number, execution begins at that memory address. If you
default the entry, the current contents of the Program Counter are
used as the beginning address.

%END
